Fν [μJy] λ [nm]

PSS 1537+1227 QSO 0840+3633

Mg II 280

Fe II 275

Fe II 260

Fe II 238

Fe II 226

Mn I 221

Fe I 217

Cr II 206

Fe III 191

Al III 186

Si II 181

Al II 167