Mean Intensity [nW/m2/sr]

Frequency [THz]

1 cm 1000 100 10 1

Wavelength [μm]

996

34 59

1000

100

10

1

0.03 0.1 0.3 1 3 10 30 100 300 1000

Ned Wright - UCLA